0.001

0.01

0.1

Density [g cm^{− 2}]

10^{− 4}

10^{− 3}

10^{− 2}

10^{− 1}

Density [g cm^{− 2}]

10^3

10^4

10^5

10^6

Temperature [K]

10^{− 6}

10^{− 4}

10^{− 2}

10^0

[Z/H]